GENFIT Entries 990 Mean 0.09248 RMS 0.0136 Integral 957

0 0.02 0.04 0.06 0.08 0.1 0.12 0.14 0 20 40 60 80 100 120 140 GEN with LHE mom tr

LHEtrack

Entries 990 Mean 0.08374 RMS 0.008874 Integral 986