299.98 299.9802 299.9804

1

10

210 z coord, standard epsil

299.98 299.9802 299.9804 1

10

210

z coord, epsil: standar for air, 0.0001 for Si

299.98 299.9802 299.9804

1

10

210

z coord, epsil: 0.0001 for Si and air