, GeV/c MC P 8.899999 8.8999995 8.9 8.9000005 8.900001

P, GeV/c Δ

-25

-20

-15

-10

-5

0 -6 10× dMom Entries 9702 Mean x 8.9 Mean y -1.947e-05 P Δ

, rad MCϕ 0 1 2 3 4 5 6

, rad ϕΔ

-0.2

-0.15

-0.1

-0.05 0 0.05 0.1 0.15 0.2 -6 10× diffPhi Entries 9702 Mean x 3.134 Mean y -3.983e-10 ϕ

, rad MCθ 0.003 0.004 0.005 0.006 0.007 0.008 0.009

, rad θΔ

-2 -1.5 -1 -0.5 0 0.5 1 1.5 2 -9 10× diffTheta Entries 9702 Mean x 0.005895 Mean y -5.923e-11 θ Without Magnetic Filed