By(z) Entries 850 Mean 471.8 RMS 63.05

-200 -100 0 100 200 300 400 500 600 0

0.2

0.4

0.6

0.8

1 By(z) for Beam Momentum = 11.91 GeV/c

Bz(z) Entries 850 Mean 42.1 RMS 109

-200 -100 0 100 200 300 400 500 600 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 Bz(z) for Beam Momentum = 11.91 GeV/c