x [cm]

20.6 20.8 21 21.2 21.4 21.6 21.8 count

0

1000

2000

3000

4000

5000^{1.5 GeV/c}

4.06 GeV/c 8.9 GeV/c 11.91 GeV/c 15 GeV/c

X hit positions