h Entries 283 Mean 0.1196 RMS 2.34

-10 -8 -6 -4 -2 0 2 4 6 8 10 0 2 4 6 8 10 12 14 h (GeaneTrackPar.fX - GeaneTrackFinal.fX)/GeaneTrackPar.fDX